File = deposit_det10.out Energy Deposition for each cell det10 Date = 21:24 31-Jul-2021

calculated byPHITS 3.24 plotted byANGEL 4.50

0.0 0.5 1.0 1.5 2.0

10^0

10^1

10^2

Deposit Energy [MeV]

Relative Intensity [counts] % Response [cm^2] no. = 1, reg = 12

all

vol= 1.0000E+00 [cm^3]